-3 -2 -1 0 1 2 3 0

100

200

300

400

500 hist2 Nent = 10000 Mean = 0.999 RMS = 0.4976

Histogram from my function hist2

0 0.5 1 1.5 2 2.5 3 0

2

4

6

8

10 gaus

-3 -2 -1 0 1 2 3 0 100 200 300 400 500 600 700

hist1 Nent = 30000 Mean = -0.00027 RMS = 0.9874

Histogram from a gaussian hist1